Measurement of the p +^6Li →^7Be + η reaction near threshold energies

Marcel Uličný^∗ GEM Collaboration

[http://ikpgem02.ikp.kfa-juelich.de/gem/]

Forschungszentrum Jülich, Germany

[http://www.fz-juelich.de]

The p+^6Li →^7Be+η reaction near the kinematical threshold has been studied within the GEM Collaboration. Following the previous line of η-production and η-bound states studies on light nuclei. Proton beam of 1297 MeV/c, from the COSY Accelerator, Forschungszentrum Jülich, has been used to test the experimental setup. For the registration of the recoiled nuclei, the Big Karl Spectrometer operates as a full solid angle detector. The results of the test run as well as further detector improvements are discussed.

∗On leave from University of P. J. Šafárik, Košice, Slovakia